# QDI Desktop Manager

QDI Desktop Manager (QDM) supports stronger function for Windows 95 and Windows NT.These functions enable user to view basic information about your computer, and to  monitor some key reference data about computer health in real time. QDM for network also help you remote access and control computers in your local area network.

Going with the computer's development, the system of the computer will become more and more complexity; at the same time, the control of the computer's hardware will be strengthened. Today, it is possible to monitor and manage your complex hardware from Windows system.Using QDM. you can improve your managing level.

QDM has enable to report events about PC health as follow:

•	Temperature

Monitor CPU temperature, Base Board temperature.

•	Voltage of power supply :

Monitor seven voltage , From +12V to -12V.

•	Rotate speed of the fan :

Monitor CPU fan , chassis fan and backup fan.

•	Chassis :

Monitor the illegal intrusion of the chassis.

------- The end -------