Contents
 	INFOCFG: Information Config Application

INFOCFG is a application of QDM software. Users can use this application to config the information of their Motherboard , Such as Voltage , Temperature , Fan and Chassis , etc. In this application , users can enable or disable any information as they want , and they can change the value of the information which will be monitored in QDM software. The detail of each information will be introduced below .

Here is the illustrate of the application.

In this interface , user can enable or disable the item by check or uncheck the checkbox in the right of the window. If the item being enabled , the menu item on the menubar will be enabled ; If the item being disabled , the menu item on the menubar will be disabled.

Fast Goto:

File Menu

DMI BIOS Menu

Fans Menu

Temperatures Menu

Voltages Menu

Chassis


Help on File Menu
File Menu

In file menu , there are two menu item. It’s Save & Exit  and  Exit.


Topics
DMI BIOS Menu

If you select this menu , a dialogbox will appears. In this dialogbox , you can change your computer’s Chipset and CPU Max Speed. These two information is not exist in the standard DMI BIOS data structure, it can be shown in the further application.

The dialogbox is shown here:


Topics
Fans Menu

If you select this menu , a dialogbox will appears. In this dialogbox , you can change some value about your computer’s Fan.

For example:

You can enable or disable to monitior one or more Fans which installed on your MotherBoard;

You can change one or more Fans’ Nominal Value , Threshold Value and Min Threshold Value to fit your computer’s running enviroment.

Notice:

When you change the value, you must follow this formula:

Nominal Value >= Threshold Value >= Min Threshold Value

The dialogbox is shown here:


Topics
Temperatures Menu

If you select this menu , a dialogbox will appears. In this dialogbox , you can change some value about your computer’s Temperatures. There are MotherBoard Temperature , CPU A Temperature and CPU B Temperature(if you have two CPUs).

For example:

You can enable or disable to monitor one or more Temperatures;

You can change one or more Temperatures’ Nominal Value , Threshold Value and Max Threshold Value to fit your computer’s running enviroment.

Notice:

When you change the value, you must follow this formula:

Nominal Value <= Threshold Value <= Max Threshold Value

The dialogbox is shown here:


Topics
Voltages Menu

If you select this menu , a dialogbox will appears. In this dialogbox , you can change some value about your computer’s Voltages.

For example:

You can enable or disable to monitor one or more Voltages;

You can change one or more Voltages’ Deviation , Max Deviation to fit your computer’s running enviroment.

Notice:

When you change the value, you must follow this formula:

Deviation <= Max Deviation

The dialogbox is shown here:


Topics
Chassis

The Chassis item has not dialogbox and menu item. If you want to enable or disable the application to monitior it, just check its checkbox.


Save the configuration file and end this application.


End this application without save the change of configured information.


This feather only can be used on QDI’s MotherBoard, because of QDI’s SpeedEasy Technique.


Fans’Nominal Value is the standard value of fans which is running under normal enviroment.


Fans’ Threshold Value is a threshold for fans, if the rotation speed of fans is below this threshold, system will send a warning message.


Fans’ Min Threshold Value is the minimum threshold for fans, if the rotation speed of fans is below this threshold, system will send a critical message.


Temperatures’Nominal Value is the standard value of device’s temperature under which the device can work normally.


Temperatures’ Threshold Value is a threshold for device’s temperature, if the temperature of device is over this threshold, system will send a warning message.


Temperatures’ Max Threshold Value is a threshold for device’s temperature, if the temperature of device is over this threshold, system will send a critical message.


Voltages’ Deviation Value is a difference between the current voltage value and standard voltage value. If the current voltage value is smaller than the standard value and the difference is bigger than the Deviation Value , the system will send a Low Warning message; If the current voltage value is bigger than the standard value and the difference is bigger than the Deviation Value , the system will send a High Warning message.


Voltages’ Max Deviation Value is a difference between the current voltage value and standard voltage value. If the current voltage value is smaller than the standard value and the difference is bigger than the Max Deviation Value , the system will send a Low Critical message; If the current voltage value is bigger than the standard value and the difference is bigger than the Max Deviation Value , the system will send a High Critical message.