QDM: QDI Desktop Manager
QDI Desktop Manager

QDM (QDI Desktop Manager) is a system-managing software that can run under Windows 95 and Windows NT platform. It is a component of QDI ManageEasy. QDM can browse some important parameters of PC board and main components of the board; in addition QDM provides necessary control methods for security.

The functions, which QDM provided, are useful to terminal clients and vendors.

Remember the QDM is running as a CLIENT, if the your computer is installed network protocol such as TCP/IP or NetBios, some of your computer's important information can be browsed by the computer which installed QDI Desktop Manager for Administrator, if you give the administrator special privilege.

Current QDM version has implemented following functions:

•	View DMI BIOS Information

Using QDM, user can view DMI BIOS information such as CPU, Cache, Memory, Port, Slot, etc.

•	View Log

User can use QDM to watch some event log.

•	Check the voltage, the temperature, the fan, and the chassis

Monitor CPU fan, chassis fan and backup fan, etc.

Monitor voltage, temperature and the intrusion of the chassis

•	Set the thresholds of the temperature, the voltage and the fan

User can set the thresholds, so that the QDM can report to the user, if some value is above the thresholds.

1	Introduction

2	Basic hardware

3	Memory

4	Input/outputs ports

5	PCHealth

6	Log

7	Configuration

8	Set Privilege

9	Disk Information

10	OS Information

11	Audio and Video

12	Network

13	Basic Input Device


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


Introduction

QDM (QDI Desktop Manager) is a system-managing software that can run under Windows 95 and Windows NT platform. It is a component of QDI ManageEasy. QDM can browse some important parameters of PC board and main components of the board; in addition QDM provides necessary control methods for security.

The functions, which QDM provided, are useful to terminal clients and vendors. Remember the QDM is running as a CLIENT, if the your computer is installed network protocol such as TCP/IP or NetBios, some of your computer's important information can be browsed by the computer which installed QDI Desktop Manager for Administrator, if you give the administrator special privilege.

Current QDM version has implemented following functions:

•	View DMI BIOS Information

Using QDM, user can view DMI BIOS information such as CPU, Cache, Memory, Port, Slot, etc.

•	View Log

User can use QDM to watch some event log.

•	Check the voltage, the temperature, the fan, and the chassis

Monitor CPU fan, chassis fan and backup fan, etc.

Monitor voltage, temperature and the intrusion of the chassis

•	Set the thresholds of the temperature, the voltage and the fan

User can set the thresholds, so that the QDM can report to the user, if some value is above the thresholds.

•	View the information of disk, network adapter, audio and display card, etc

User can view the information of disk, network adapter, audio card, display adapter, operating system, etc

Please see following items:

•	Basic hardware

•	Memory

•	Input/outputs ports

•	PCHealth

•	Log

•	Configuration

•	Disk Information

•	OS Information

•	Audio and Video

•	Network

•	Basic Input Device


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help Basic Hardware
Basic Hardware

Click the Basic Hardware button in the Toolbar or the Basic Hardware icon in the List Control. A dialog will appear (just like the following chart).

This dialog displays some DMI BIOS information, such as manufacturer of the BIOS, the speed of the Processor etc.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


IOPorts Input /output ports
Input /Output Ports

Click the Input/output ports button in the Toolbar or the Input/output ports icon in the List Control. A dialog will appear (just like the following chart).

This dialog lists all the Input/output ports of you computer.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help Memory
 Memory

Click the Memory button in the Toolbar or the Memory icon in the List Control. A dialog will appear (just like the following chart).

This Dialog tells you some parameters of you memory chipset.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help Configuration
 Configuration

Using Configuration Dialog Box, the user can configure thresholds of the Temperature, Voltage and the Fan, Also the user can select some components to report event. For example, If CPUs item in Temperature Box is selected, When the temperature of the CPU is above the thresholds which user set, the QDM will report the event.

About how to configure thresholds, please see the following items

Configure Fan Thresholds

Configure Voltage Thresholds

Configure Temperature Thresholds


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help suggestion
Suggestion

The Suggestion Dialog Box provides some methods to deal with the event.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Fan
 Fan

In following dialog box, user can configure the thresholds of the Fan.

The Location column displays the Fan's location in the Mother Board, The Current revolution column displays the Fan's current revolution, and it is read-only. The Warning revolution and Critical revolution column display the current thresholds of the Fan, user can edit it.

While completing configuration, click OK to save the thresholds, or click CANCEL to cancel the configuration.

NOTE: the value of the Critical must less than The Warning's.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Voltage
Voltage

In following dialog box, user can configure the thresholds of the Voltages. Using this dialog, user can configure the Warn and Critical thresholds of come voltage.

NOTE: the value of the Critical must greater than The Warning's,

and, these two value must not be above 1 , and less than 0.

While completing configuration, click OK to save the thresholds, or click CANCEL to cancel the configuration.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Temperature
Temperature

In following dialog box, user can configure the thresholds of the Temperature. The Current column displays the current temperature , Warning column and Critical column display the current thresholds. User can edit the values in the Warning column and the values in Critical column. While changing thresholds, remember the following rule:

the value of the Critical must greater than The Warning's.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help PCHealth
 PCHealth

Click the PCHealth button in the Toolbar or the PCHealth icon in the List Control. A dialog will appear(just like the following chart).

This dialog displays all the statuses of Temperature, Power, Fan and Chassis. The current values and the nominal values are also displayed. If some component has trouble while running, you can click SUGGESTION button.

Suggestion


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Help Log
Log

Log Dialog Box tells the user some event happened recently. These events include the happening time, types, and severity.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Set Previilege
Set Privilege

Select Tools | Set Privilege from menu, a dialog box will popped up. In this dialog, user can set some privileges to administrator.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Disk Information
Disk Infor

 Dialog Disk Box displays information about the disks, such as the type, volume, file system, capacity regarding the floppy disk, hard disk and CD-ROM.

The dialog has two pages, one is the Disk Information, Other is Disk Threshold Settings.

Disk Information

This  page lists the disks in the local computer. This includes  the information of the disk  drives.Due to the consideration on performance, disk information about floppy drives is not provided.

Disk Threshold Settings.

This page is about  the Disk Threshold setting, you can configure thresholds of the Disks. While the  the  hard disk free space  is beyond the thresholds which you set, the QDM will report the event.

NOTE: the value of the Critical must be less than the Warning′s.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : OS Information
 OS Information

Click  the Operation System  in the Toolbar or select it from the menu, a dialog box will appear as follows. Some information about the operating system, such as operating system name, version, build number, and information about environment variables, such as temp directory, prompt, windows boot directory, path etc, are provided.

Operating System page

Environment Variable Page

This dialog has two pages,  Operating System and  Environment Variables.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM : Audio and Video
 Audio and Video

Audio Card

Click Sound Adapter in the Toolbar or select it from the menu, a dialog box will appear as follows. Various information about the sound adapter, such as device name, manufacturer, hardware version, driver name, version, are provided.

Video Card

Click VGA Adapter in the Toolbar or select it from the menu, a dialog box will appear as follows. Various information about the display adapter, such as device name, manufacturer, hardware version, Video Memory, driver name, version, are provided.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Network
 Network

Click the Network button in the Toolbar or the Network information icon in the List Control. A dialog box  appears (as shown in the following chart).

This dialog box indicates you various parameters of your network, including information about network adapter and host.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com


QDM: Basic Input Device
Basic input device

Click the Input Device button in the Toolbar or the Input Device icon in the List Control. A dialog box  appears (as shown in the following chart).

This dialog box indicates you various parameters of your mouse and keyboard.


 ***  WHD  Unregisterd ***

 This help file generated using Windows Help Designer

 Windows Help Designer is copyright (C) 1996,1998 by Nick Ameladiotis

 For more informations visit  http://www.devgr.com