M001 = 101


Öffnet den Toolbox-Dialog Mail um das gescannte Bild an eine E-Mail-Mitteilung anzuhängen.


M002 = 102


Öffnet den Toolbox-Dialog Kopieren um das gescannte Bild auszudrucken.


M003 = 103


Öffnet den Toolbox-Dialog Speichern um das gescannte Bild zu speichern.


M004 = 104


Öffnet den Toolbox-Dialog Scannen um das gescannte Bild an ein festgelegtes Programm zu übertragen.


M005 = 105


Öffnet den Toolbox-Dialog OCR um das gescannte Bild an die OCR-Software zu übertragen.


M006 = 106


Öffnet den Toolbox-Dialog Einstellungen um die Funktionen der Tasten vorne am Scanner zu ändern.


M007 = 107


Dieses Symbol zeigt, wie die Tasten vorne am Scanner den Toolbox-Schaltflächen zugeordnet sind. Zuordnungen können mit der Schaltfläche Einstellungen geändert werden.


M008 = 108


M009 = 109


M010 = 110


M011 = 111


ES001  OS001  SS001  FS001  CS001 = 201


Wahl des Bildyps des zu scannenden Bilds aus der Liste.


ES002  OS002  SS002  FS002  CS002 = 202


Wahl der Größe des zu scannenden Bilds aus der Liste.


ES003  OS003  SS003  FS003  CS003 = 203


Öffnet den Toolbox-Dialog Speichern um das gescannte Bild zu speichern.


ES004  SS004  FS004  CS004 = 204


Bei Wahl dieser Option erscheint nach Klicken der Schaltfläche Scannen das Scanner-Treiberfenster zum Vornehmen erweiterter Scan-Einstellungen.


ES005 = 205


Liste der Obergrenze der angehängten Datei. Durch diese Einstellung wird die Bildqualität (Auflösung) begrenzt.


EF001  FF001  OF001  SF001 = 206


Zeigt den Ordner, in dem das gescannte Bild gespeichert wird.


EF002  OF002  SF002  FF002 = 207


Klicken Sie hier um den Speicherordner für die gescannten Bilder zu wählen.


EF003  OF003  SF003  FF003 = 208


Legt Speichern der gescannten Bilder in einem Unterordner mit aktuellem Datum fest.


EF004  FF004  OF004  SF004 = 209


Zeile zum Eintragen des Dateinamens für das gescannte Bild. Existiert bereits eine gleichnamige Datei, wird am Namensende eine 4-stellige Nummer beginnend mit 0001 angefügt.


ED001 = 210


Zeigt die E-Mail Software, an die das gescannte Bild geschickt wird.


ED002 = 211


Klicken Sie hier um die E-Mail Software zu wählen, an die das gescannte Bild geschickt wird.


ED003 = 212


Löscht die Verknüpfung.


EB001  OB001  SB001  FB001  CB001 = 220


Schließt den Dialog und zeigt das Toolbox-Hauptfenster.


EB002  TB002  CB002  FB002  SB002  OB002  = 221


Setzt die Einstellungen des Dialogs in die Standard-Einstellung zurück.


EB003 = 222


Startet den Scan und hängt das gescannte Bild an eine E-Mail-Mitteilung an.


EB004  OB004  SB004  FB004  CB004 = 223


Speichert die in diesem Dialog vorgenommenen Änderungen.


CS005 = 305


Korrigiert die Helligkeit des gescannten Bilds.


CS006 = 306


Legt Drucken des gescannten Bilds in Größe 1:1 fest.


CS007 = 307


Legt Drucken des gescannten Bilds zentriert und, der Papiergröße angepasst, vergrößert oder verkleinert fest.


CP001 = 308


Wahl der Papiergröße des Druckers aus der Liste.


CP002 = 309


Wählt die Anzahl der Kopien.


CP003 = 310


Wählt den Druckertreiber.


CP004 = 311


Klicken Sie hier um erweiterte Drucker-Einstellungen vorzunehmen.


CP005 = 312


Wahl der BJ Kassette zum Drucken aus der Liste. Dieses Pulldown-Menü ist grau hinterlegt, wenn die Option nicht verfügbar ist.


CP006 = 313


Wahl des Druckmediums aus der Liste. Dieses Pulldown-Menü ist grau hinterlegt, wenn die Option nicht verfügbar ist.


CP007 = 314


Wahl der Druckqualität aus der Liste. Die Pulldown-Liste ist grau hinterlegt, wenn diese Option nicht verfügbar ist.


CB003 = 322


Startet den Scan und schickt das gescannte Bild zum Drucken an den Drucker.


FF005  SF005  OF005 = 410


Liste der Dateiformate.


FB003 = 422


Startet den Scan und speichert das gescannte Bild.


SD001 = 411


Zeigt den Pfad des Programms, an das das gescannte Bild geschickt wird.


SD002 = 412


Klicken Sie hier um das Programm zu wählen, an das das gescannte Bild geschickt wird.


SB003 = 522


Startet den Scan und übertragt das gescannte Bild an eine Software.


OD001 = 611


Zeigt den Pfad der OCR-Software an die das gescannte Bild geschickt wird.


OD002 = 612


Klicken Sie hier um die OCR-Software zu wählen, an die das gescannte Bild geschickt wird.


OB003 = 622


Startet den Scan und übertragt das gescannte Bild an die OCR-Software.


TS001 = 701


Liste der Scanner


TF001 = 702


Legt fest, welche Toolbox-Schaltfläche mit der <SCAN>-Taste des Scanners verknüpft wird.


TF002 = 703


Legt fest, welche Toolbox-Schaltfläche mit der <E-Mail>-Taste des Scanners verknüpft wird.


TF003 = 704


Legt fest, welche Toolbox-Schaltfläche mit der <COPY>-Taste des Scanners verknüpft wird.


TB001 = 705


Schließt den Dialog ohne die in diesem Dialog vorgenommenen Korrekturen auszuführen.


TB002 = 706


Schließt den Dialog und führt die in diesem Dialog vorgenommenen Korrekturen aus.