S3ガンマ ヘルプ

ヘルプの使い方を見るには、F1キーを押してください。   Copyright


スプライン表示には、赤、緑、青の各ガンマ スプラインが描かれます。これらのスプラインは、ガンマがどのように調節されているかを示す曲線です。一般に、隅から隅へ描かれる直線は、1.00 (つまり、調節なし) のガンマを表します。この45度の直線よりも上に描かれる弧は、(スプラインの) その色が通常よりも明るくなるようにガンマが調節されることを意味します。この45度の直線よりも下に描かれる弧は、その色が通常よりも暗くなるように調節されることを意味します。


赤の成分のガンマ値を調節するには、赤のスライダを動かします。スライダを右へ動かすほどガンマ値が高くなり、赤の色がより明るくなります。スライダを左へ動かすほどガンマ値が低くなり、赤の色がより暗くなります。


赤の成分のガンマ調節を変更するには、0.20～3.00の値をこの領域に入力します。入力値が大きいほど赤の色がより明るくなり、入力値が小さいほど赤の色がより暗くなります。


緑の成分のガンマ値を調節するには、緑のスライダを動かします。スライダを右へ動かすほどガンマ値が高くなり、緑の色がより明るくなります。スライダを左へ動かすほどガンマ値が低くなり、緑の色がより暗くなります。


緑の成分のガンマ調節を変更するには、0.20～3.00の値をこの領域に入力します。入力値が大きいほど緑の色がより明るくなり、入力値が小さいほど緑の色がより暗くなります。


青の成分のガンマ値を調節するには、青のスライダを動かします。スライダを右へ動かすほどガンマ値が高くなり、青の色がより明るくなります。スライダを左へ動かすほどガンマ値が低くなり、青の色がより暗くなります。


青の成分のガンマ調節を変更するには、0.20～3.00の値をこの領域に入力します。入力値が大きいほど青の色がより明るくなり、入力値が小さいほど青の色がより暗くなります。


このチェックボックスは、赤、緑、青の各ガンマ調節をリンクさせるかどうかを指定します。チェックマークを付けてある場合、ガンマ成分がリンクされ、3つのガンマ値が常にすべて同じ値になります。チェックマークを付けてない場合、ガンマ調節をそれぞれ独立に変更することができます。


このボタンは、すべてのガンマ調節を1.00に戻し、[リンク] チェックボックスにチェックマークを付けます。これはデフォルト設定で、ビデオ出力にはガンマ調節が適用されません。


これをクリックすると、現在のガンマ設定が保存されます。入力する名前はスキーム一覧に表示されるので、名前を選択して自分の設定を簡単に復元できます。


[スキーム] ボックスで選択されているスキームを削除します。


S3ガンマは、S3グラフィック チップからの出力のガンマを調節するためのユーティリティです。ガンマは簡単にインストールでき、輝度調節のようなものです。


システムに適用されているガンマの変更に使用できるスキームを一覧表示します。1つのスキームには、赤、緑、青の各ガンマ調節と、これらの3つの成分がリンクされているかどうかが保存されます。


現在のガンマ設定に名前を付けて入力する場所を提供します。入力する名前はスキーム一覧に表示されるので、これらの設定を後で簡単に復元できます。


著作権について

S3, S3 On Board, Trio3Dは、S3 Incorporatedの商標です。